Summary Page Created:Sat November 24, 2007 14:31 EST page: 1 of 3

Chandra X-ray Center Seq Num: 400453

Instrument: HRC Obs ID: 6193 Source: GC-3 PI: Dr. Rudy Wijnands Title: Monitoring observations of the Galactic Center region

hrcf06193N003 full img2.fits hrcf06193N003 cntr img2.fits

Summary Page Created:Sat November 24, 2007 14:31 EST page: 2 of 3

Chandra X-ray Center Seq Num: 400453

Instrument: HRC Obs ID: 6193 Source: GC-3 PI: Dr. Rudy Wijnands Title: Monitoring observations of the Galactic Center region

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T19:17:30 Date and time of file creation DATE-OBS 2005-10-20T20:03:02 Observation start date DATE-END 2005-10-20T21:21:32 Observation end date RA PNT 266.86021307615 Pointing RA DEC PNT -28.999763114028 Pointing Dec ROLL PNT 265.4636084409 Pointing Roll RA TARG 266.8625 Observer’s specified target RA DEC TARG -28.996111 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T19:29:54 Date and time of file creation DATE-OBS 2005-10-20T20:03:02 Observation start date DATE-END 2005-10-20T21:21:32 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT GC-3 Source name TITLE Monitoring observations of the Galactic Center region

Proposal tit

OBSERVER Dr. Rudy Wijnands Principal investigator OBS ID 6193 Observation id SEQ NUM 400453 Sequence number RA NOM 266.86021307615 Nominal RA DEC NOM -28.999763114028 Nominal Dec ROLL NOM 265.4636084409 Nominal Roll

Summary Page Created:Sat November 24, 2007 14:31 EST page: 3 of 3

Chandra X-ray Center Seq Num: 400453

Instrument: HRC Obs ID: 6193 Source: GC-3 PI: Dr. Rudy Wijnands Title: Monitoring observations of the Galactic Center region

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 266.761299 -28.883220 1242.545410 41.396812 30.015486 266.662059 -28.898758 95.435715 17.674170 5.399728 266.845307 -28.677631 98.863785 24.130518 4.097044 266.945306 -29.253562 69.329544 16.990774 4.080423 267.061154 -28.819708 61.541668 15.155571 4.060663 267.221145 -28.985984 90.239204 23.026005 3.919013 266.802951 -29.323346 74.598404 19.533106 3.819075 266.910984 -28.672941 98.117683 26.283533 3.733048 267.154841 -29.094369 61.120281 17.552610 3.482119 267.120952 -29.127526 47.979473 14.356283 3.342054