Summary Page Created:Thu March 2, 2006 03:05 EST page: 1 of 3

Chandra X-ray Center Seq Num: 500599

Instrument: HRC Obs ID: 6251 Source: SGR 1806-20 PI: Dr Chryssa Kouveliotou Title: Resolving an X-ray Jet from the Magnetar SGR 1806-20

hrcf06251N002 full img2.fitshrcf06251N002 cntr img2.fits

Summary Page Created:Thu March 2, 2006 03:05 EST page: 2 of 3

Chandra X-ray Center Seq Num: 500599

Instrument: HRC Obs ID: 6251 Source: SGR 1806-20 PI: Dr Chryssa Kouveliotou Title: Resolving an X-ray Jet from the Magnetar SGR 1806-20

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-03-02T05:34:12 Date and time of file creation DATE-OBS 2005-04-22T18:29:31 Observation start date DATE-END 2005-04-23T02:46:07 Observation end date RA PNT 272.1636719876 Pointing RA DEC PNT -20.406404994794 Pointing Dec ROLL PNT 92.675530757656 Pointing Roll RA TARG 272.16375 Observer’s specified target RA DEC TARG -20.411056 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-03-02T08:02:50 Date and time of file creation DATE-OBS 2005-04-22T18:29:31 Observation start date DATE-END 2005-04-23T02:46:07 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT SGR 1806-20 Source name TITLE Resolving an X-ray Jet from the Magnetar SGR 1806-20

Proposal titl

OBSERVER Dr Chryssa Kouveliotou Principal investigator OBS ID 6251 Observation id SEQ NUM 500599 Sequence number RA NOM 272.1636719876 Nominal RA DEC NOM -20.406404994794 Nominal Dec ROLL NOM 92.675530757656 Nominal Roll

Summary Page Created:Thu March 2, 2006 03:05 EST page: 3 of 3

Chandra X-ray Center Seq Num: 500599

Instrument: HRC Obs ID: 6251 Source: SGR 1806-20 PI: Dr Chryssa Kouveliotou Title: Resolving an X-ray Jet from the Magnetar SGR 1806-20

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 272.163956 -20.411073 1620.916626 45.818027 35.377270 272.224490 -20.707806 1764.644653 88.343391 19.974834 272.124018 -20.714158 1436.605347 77.838295 18.456280 272.142696 -20.713986 1303.310669 91.865463 14.187168 272.121575 -20.693361 1061.000000 83.774277 12.664985 272.204503 -20.708124 1127.440186 97.652016 11.545488 272.120166 -20.675322 787.904907 75.089172 10.492923 272.226518 -20.665206 758.333557 73.309082 10.344334 272.172912 -20.161195 677.708313 68.686577 9.866677 272.227381 -20.654958 620.275879 65.787506 9.428474