Summary Page Created:Mon February 27, 2006 03:03 EST page: 1 of 3

Chandra X-ray Center Seq Num: 600431

Instrument: ACIS Obs ID: 5912 Source: M86 PI: Dr. Christine Jones Title: Understanding the Process of Ram Pressure Stripping in M86

acisf05912N002 full img2.fits acisf05912N002 cntr img2.fits

Summary Page Created:Mon February 27, 2006 03:03 EST page: 2 of 3

Chandra X-ray Center Seq Num: 600431

Instrument: ACIS Obs ID: 5912 Source: M86 PI: Dr. Christine Jones Title: Understanding the Process of Ram Pressure Stripping in M86

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-27T06:46:11 Date and time of file creation DATE-OBS 2005-03-09T05:42:23 Observation start date DATE-END 2005-03-09T15:31:48 Observation end date RA PNT 186.75733880825 Pointing RA DEC PNT 12.881562424862 Pointing Dec ROLL PNT 114.9085324905 Pointing Roll RA TARG 186.7575 Observer’s specified target RA DEC TARG 12.876944 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.60722351 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-27T08:02:44 Date and time of file creation DATE-OBS 2005-03-09T05:42:23 Observation start date DATE-END 2005-03-09T15:31:48 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT M86 Source name TITLE Understanding the Process of Ram Pressure Stripping in M86

Proposa

OBSERVER Dr. Christine Jones Principal investigator OBS ID 5912 Observation id SEQ NUM 600431 Sequence number RA NOM 186.75733880825 Nominal RA DEC NOM 12.881562424862 Nominal Dec ROLL NOM 114.9085324905 Nominal Roll

Summary Page Created:Mon February 27, 2006 03:03 EST page: 3 of 3

Chandra X-ray Center Seq Num: 600431

Instrument: ACIS Obs ID: 5912 Source: M86 PI: Dr. Christine Jones Title: Understanding the Process of Ram Pressure Stripping in M86

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 186.723958 12.833001 331.636353 19.770874 16.773985 186.671251 12.786911 304.784088 20.415028 14.929399 186.764101 12.900516 89.428574 11.166598 8.008577 186.864872 12.837593 87.462502 12.499080 6.997515 186.791001 12.815117 69.142860 10.304362 6.710057 186.824108 12.908704 61.285713 10.433315 5.874040 186.477508 12.934702 197.625000 34.391674 5.746304 186.530304 12.927690 141.264633 26.612829 5.308140 186.450042 12.791059 126.405319 25.013077 5.053569 186.431929 12.832572 142.789886 28.284655 5.048317