Summary Page Created:Mon February 27, 2006 10:50 EST page: 1 of 3

Chandra X-ray Center Seq Num: 600432

Instrument: ACIS Obs ID: 5913 Source: M86 PI: Dr. Christine Jones Title: Understanding the Process of Ram Pressure Stripping in M86

acisf05913N002 full img2.fits acisf05913N002 cntr img2.fits

Summary Page Created:Mon February 27, 2006 10:50 EST page: 2 of 3

Chandra X-ray Center Seq Num: 600432

Instrument: ACIS Obs ID: 5913 Source: M86 PI: Dr. Christine Jones Title: Understanding the Process of Ram Pressure Stripping in M86

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-27T15:00:03 Date and time of file creation DATE-OBS 2005-03-19T06:39:36 Observation start date DATE-END 2005-03-19T17:13:09 Observation end date RA PNT 186.29677832039 Pointing RA DEC PNT 13.276450495545 Pointing Dec ROLL PNT 149.20653874943 Pointing Roll RA TARG 186.299583 Observer’s specified target RA DEC TARG 13.272722 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-27T15:49:31 Date and time of file creation DATE-OBS 2005-03-19T06:39:36 Observation start date DATE-END 2005-03-19T17:13:09 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT M86 Source name TITLE Understanding the Process of Ram Pressure Stripping in M86

Proposa

OBSERVER Dr. Christine Jones Principal investigator OBS ID 5913 Observation id SEQ NUM 600432 Sequence number RA NOM 186.29677832039 Nominal RA DEC NOM 13.276450495545 Nominal Dec ROLL NOM 149.20653874943 Nominal Roll

Summary Page Created:Mon February 27, 2006 10:50 EST page: 3 of 3

Chandra X-ray Center Seq Num: 600432

Instrument: ACIS Obs ID: 5913 Source: M86 PI: Dr. Christine Jones Title: Understanding the Process of Ram Pressure Stripping in M86

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 186.153808 13.292349 245.386368 18.550926 13.227715 186.368518 13.290336 222.285721 16.838400 13.201118 186.330476 13.183396 132.875000 13.613955 9.760205 186.158021 13.224145 150.704544 15.845015 9.511165 186.337240 13.165688 73.151726 12.212789 5.989764 186.150343 13.302884 68.750000 11.743137 5.854483 186.196757 13.304160 53.397728 9.212045 5.796512 186.363336 13.215344 50.875000 8.938970 5.691371 186.278746 13.352010 52.857143 9.580728 5.517028 186.221467 13.303853 50.857143 9.461879 5.374952