Summary Page Created:Wed March 15, 2006 15:44 EST page: 1 of 3

Chandra X-ray Center Seq Num: 600469

Instrument: ACIS Obs ID: 5950 Source: Sgr A* PI: Dr. Frederick Baganoff Title: Simultaneous Gamma-Ray to Sub-Millimeter Monitoring of Sagittarius A*

acisf05950N002 full img2.fits acisf05950N002 cntr img2.fits

Summary Page Created:Wed March 15, 2006 15:44 EST page: 2 of 3

Chandra X-ray Center Seq Num: 600469

Instrument: ACIS Obs ID: 5950 Source: Sgr A* PI: Dr. Frederick Baganoff Title: Simultaneous Gamma-Ray to Sub-Millimeter Monitoring of Sagittarius A*

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-03-15T19:23:02 Date and time of file creation DATE-OBS 2005-07-24T19:58:27 Observation start date DATE-END 2005-07-25T10:07:50 Observation end date RA PNT 266.41518839508 Pointing RA DEC PNT -29.012220687317 Pointing Dec ROLL PNT 276.74669214293 Pointing Roll RA TARG 266.416667 Observer’s specified target RA DEC TARG -29.007778 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.60722351 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-03-15T20:43:20 Date and time of file creation DATE-OBS 2005-07-24T19:58:27 Observation start date DATE-END 2005-07-25T10:07:50 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT Sgr A* Source name TITLE Simultaneous Gamma-Ray to Sub- Millimeter Monitoring of Sagittarius A*

Proposal title

OBSERVER Dr. Frederick Baganoff Principal investigator OBS ID 5950 Observation id SEQ NUM 600469 Sequence number RA NOM 266.41518839508 Nominal RA DEC NOM -29.012220687317 Nominal Dec ROLL NOM 276.74669214293 Nominal Roll

Summary Page Created:Wed March 15, 2006 15:44 EST page: 3 of 3

Chandra X-ray Center Seq Num: 600469

Instrument: ACIS Obs ID: 5950 Source: Sgr A* PI: Dr. Frederick Baganoff Title: Simultaneous Gamma-Ray to Sub-Millimeter Monitoring of Sagittarius A*

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 266.259888 -28.913925 55360.281250 253.169937 218.668472 266.398145 -29.023334 304.285706 19.881319 15.305106 266.400563 -28.944005 297.285706 19.694529 15.094837 266.374981 -29.117964 331.977509 22.492569 14.759430 266.432997 -29.082400 132.428574 14.067913 9.413519 266.422940 -28.970747 117.571426 12.929589 9.093206 266.415811 -29.005678 197.428574 22.819767 8.651647 266.420651 -29.003874 135.285721 16.211905 8.344837 266.439626 -28.974561 147.428574 18.223946 8.089828 266.531266 -28.997486 117.625000 14.609179 8.051445