Summary Page Created:Wed March 15, 2006 22:09 EST page: 1 of 3

Chandra X-ray Center Seq Num: 600471

Instrument: ACIS Obs ID: 5952 Source: Sgr A* PI: Dr. Frederick Baganoff Title: Simultaneous Gamma-Ray to Sub-Millimeter Monitoring of Sagittarius A*

acisf05952N002 full img2.fits acisf05952N002 cntr img2.fits

Summary Page Created:Wed March 15, 2006 22:09 EST page: 2 of 3

Chandra X-ray Center Seq Num: 600471

Instrument: ACIS Obs ID: 5952 Source: Sgr A* PI: Dr. Frederick Baganoff Title: Simultaneous Gamma-Ray to Sub-Millimeter Monitoring of Sagittarius A*

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-03-16T01:43:47 Date and time of file creation DATE-OBS 2005-07-29T19:51:11 Observation start date DATE-END 2005-07-30T09:07:39 Observation end date RA PNT 266.41507860613 Pointing RA DEC PNT -29.012187263596 Pointing Dec ROLL PNT 275.48089802448 Pointing Roll RA TARG 266.416667 Observer’s specified target RA DEC TARG -29.007778 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.60722351 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-03-16T03:08:03 Date and time of file creation DATE-OBS 2005-07-29T19:51:11 Observation start date DATE-END 2005-07-30T09:07:39 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT Sgr A* Source name TITLE Simultaneous Gamma-Ray to Sub- Millimeter Monitoring of Sagittarius A*

Proposal title

OBSERVER Dr. Frederick Baganoff Principal investigator OBS ID 5952 Observation id SEQ NUM 600471 Sequence number RA NOM 266.41507860613 Nominal RA DEC NOM -29.012187263596 Nominal Dec ROLL NOM 275.48089802448 Nominal Roll

Summary Page Created:Wed March 15, 2006 22:09 EST page: 3 of 3

Chandra X-ray Center Seq Num: 600471

Instrument: ACIS Obs ID: 5952 Source: Sgr A* PI: Dr. Frederick Baganoff Title: Simultaneous Gamma-Ray to Sub-Millimeter Monitoring of Sagittarius A*

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 266.259858 -28.913950 18288.476562 146.168091 125.119484 266.375154 -29.117933 316.054993 22.628201 13.967305 266.400636 -28.944064 236.428574 17.589411 13.441528 266.422945 -28.970801 161.428574 15.139571 10.662691 266.438667 -28.974741 169.000000 15.965197 10.585526 266.398164 -29.023375 142.714279 14.333394 9.956769 266.453946 -28.964414 136.954544 13.850726 9.887897 266.416904 -29.007813 249.857147 25.905760 9.644849 266.774500 -29.070770 376.956818 44.720524 8.429168 266.415790 -29.005677 184.571426 22.234467 8.301141