Summary Page Created:Sat February 25, 2006 05:09 EST page: 1 of 3

Chandra X-ray Center Seq Num: 600476

Instrument: ACIS Obs ID: 6113 Source: Sgr A* PI: Dr. Frederick Baganoff Title: Simultaneous Gamma-Ray to Sub-Millimeter Monitoring of Sagittarius A*

acisf06113N002 full img2.fits acisf06113N002 cntr img2.fits

Summary Page Created:Sat February 25, 2006 05:09 EST page: 2 of 3

Chandra X-ray Center Seq Num: 600476

Instrument: ACIS Obs ID: 6113 Source: Sgr A* PI: Dr. Frederick Baganoff Title: Simultaneous Gamma-Ray to Sub-Millimeter Monitoring of Sagittarius A*

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-25T08:56:17 Date and time of file creation DATE-OBS 2005-02-27T06:26:04 Observation start date DATE-END 2005-02-27T08:29:25 Observation end date RA PNT 266.41870440025 Pointing RA DEC PNT -29.003525252728 Pointing Dec ROLL PNT 90.574769764122 Pointing Roll RA TARG 266.416667 Observer’s specified target RA DEC TARG -29.007778 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.76843262 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-25T10:08:15 Date and time of file creation DATE-OBS 2005-02-27T06:26:04 Observation start date DATE-END 2005-02-27T08:29:25 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT Sgr A* Source name TITLE Simultaneous Gamma-Ray to Sub- Millimeter Monitoring of Sagittarius A*

Proposal title

OBSERVER Dr. Frederick Baganoff Principal investigator OBS ID 6113 Observation id SEQ NUM 600476 Sequence number RA NOM 266.41870440025 Nominal RA DEC NOM -29.003525252728 Nominal Dec ROLL NOM 90.574769764122 Nominal Roll

Summary Page Created:Sat February 25, 2006 05:09 EST page: 3 of 3

Chandra X-ray Center Seq Num: 600476

Instrument: ACIS Obs ID: 6113 Source: Sgr A* PI: Dr. Frederick Baganoff Title: Simultaneous Gamma-Ray to Sub-Millimeter Monitoring of Sagittarius A*

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 266.375175 -29.118019 42.020691 8.293504 5.066700 266.398236 -29.023375 35.714287 7.743237 4.612320 266.400552 -28.944120 29.079546 6.885638 4.223217 266.119080 -28.842401 57.485050 14.166198 4.057902 266.544635 -29.005198 22.897499 6.500649 3.522340 266.466545 -28.887060 21.238636 6.557864 3.238652 266.322669 -29.107150 20.916666 6.493425 3.221207 266.415892 -29.005693 29.857143 9.567572 3.120660