Summary Page Created:Mon March 20, 2006 10:06 EST page: 1 of 3

Chandra X-ray Center Seq Num: 701067

Instrument: ACIS Obs ID: 5644 Source: CXO M82 J095550.2+694047 PI: Dr. Tod Strohmayer Title: Chandra and RXTE Observations of the Ultraluminous QPO Source in M82

acisf05644N002 full img2.fits acisf05644N002 cntr img2.fits

Summary Page Created:Mon March 20, 2006 10:06 EST page: 2 of 3

Chandra X-ray Center Seq Num: 701067

Instrument: ACIS Obs ID: 5644 Source: CXO M82 J095550.2+694047 PI: Dr. Tod Strohmayer Title: Chandra and RXTE Observations of the Ultraluminous QPO Source in M82

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-03-20T11:34:25 Date and time of file creation DATE-OBS 2005-08-17T00:54:14 Observation start date DATE-END 2005-08-17T22:42:57 Observation end date RA PNT 148.97044231162 Pointing RA DEC PNT 69.677848460979 Pointing Dec ROLL PNT 357.24605487789 Pointing Roll RA TARG 148.959167 Observer’s specified target RA DEC TARG 69.679722 Observer’s specified target Dec DATAMODE GRADED Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-03-20T15:05:19 Date and time of file creation DATE-OBS 2005-08-17T00:54:14 Observation start date DATE-END 2005-08-17T22:42:57 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-7 Detector GRATING NONE Grating OBJECT CXO M82 J095550.2+694047 Source name TITLE Chandra and RXTE Observations of the Ultraluminous QPO Source in M82 OBSERVER Dr. Tod Strohmayer Principal investigator OBS ID 5644 Observation id SEQ NUM 701067 Sequence number RA NOM 148.97044231162 Nominal RA DEC NOM 69.677848460979 Nominal Dec ROLL NOM 357.24605487789 Nominal Roll

Summary Page Created:Mon March 20, 2006 10:06 EST page: 3 of 3

Chandra X-ray Center Seq Num: 701067

Instrument: ACIS Obs ID: 5644 Source: CXO M82 J095550.2+694047 PI: Dr. Tod Strohmayer Title: Chandra and RXTE Observations of the Ultraluminous QPO Source in M82

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 148.958860 69.679587 60979.855469 258.984283 235.457764 148.962592 69.679179 12010.857422 141.320099 84.990440 148.944049 69.678018 6766.428711 87.481651 77.346832 148.964341 69.676697 1776.000000 66.086334 26.873938 148.977859 69.683596 524.571411 27.588879 19.013872 148.908646 69.674855 341.857147 21.259422 16.080265 148.944501 69.677158 482.571442 30.647253 15.745994 148.942337 69.673992 411.857147 29.740561 13.848331 148.959898 69.672914 477.428558 35.068508 13.614168 148.974208 69.680735 531.857117 39.388523 13.502845