Summary Page Created:Sun February 19, 2006 14:49 EST page: 1 of 3

Chandra X-ray Center Seq Num: 701080

Instrument: ACIS Obs ID: 5657 Source: SDSS J091836.46+591535.4 PI: PROF. KAREN LEIGHLY Title: The Spectral Energy Distribution and Fe II Emission in Intermediate-Redshift Narrow-line Seyfert 1

Galaxies

acisf05657N002 full img2.fits acisf05657N002 cntr img2.fits

Summary Page Created:Sun February 19, 2006 14:49 EST page: 2 of 3

Chandra X-ray Center Seq Num: 701080

Instrument: ACIS Obs ID: 5657 Source: SDSS J091836.46+591535.4 PI: PROF. KAREN LEIGHLY Title: The Spectral Energy Distribution and Fe II Emission in Intermediate-Redshift Narrow-line Seyfert 1

Galaxies

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-19T19:36:23 Date and time of file creation DATE-OBS 2005-01-29T03:56:23 Observation start date DATE-END 2005-01-29T05:40:40 Observation end date RA PNT 139.63447415661 Pointing RA DEC PNT 59.263306973986 Pointing Dec ROLL PNT 168.7999586001 Pointing Roll RA TARG 139.652083 Observer’s specified target RA DEC TARG 59.259833 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-19T19:48:13 Date and time of file creation DATE-OBS 2005-01-29T03:56:23 Observation start date DATE-END 2005-01-29T05:40:40 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-2367 Detector GRATING NONE Grating OBJECT SDSS J091836.46+591535.4 Source name TITLE The Spectral Energy Distribution and Fe II Emission in Intermediate- Redshift Narrow-line Seyfert 1 Galaxies

Proposal title

OBSERVER PROF. KAREN LEIGHLY Principal investigator OBS ID 5657 Observation id SEQ NUM 701080 Sequence number RA NOM 139.63447415661 Nominal RA DEC NOM 59.263306973986 Nominal Dec ROLL NOM 168.7999586001 Nominal Roll

Summary Page Created:Sun February 19, 2006 14:49 EST page: 3 of 3

Chandra X-ray Center Seq Num: 701080

Instrument: ACIS Obs ID: 5657 Source: SDSS J091836.46+591535.4 PI: PROF. KAREN LEIGHLY Title: The Spectral Energy Distribution and Fe II Emission in Intermediate-Redshift Narrow-line Seyfert 1

Galaxies

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 139.651950 59.259933 50.000000 8.470764 5.902655 139.451734 59.449199 65.442856 11.196100 5.845148 139.364923 59.296311 26.318182 7.169740 3.670731 139.675631 59.316681 20.238636 6.465486 3.130258