Summary Page Created:Tue February 28, 2006 14:43 EST page: 1 of 3

Chandra X-ray Center Seq Num: 701111

Instrument: ACIS Obs ID: 5688 Source: AX J1426.9+2334 PI: Dr Kirpal Nandra Title: Bringing in the Last SHEEP

acisf05688N003 full img2.fits acisf05688N003 cntr img2.fits

Summary Page Created:Tue February 28, 2006 14:43 EST page: 2 of 3

Chandra X-ray Center Seq Num: 701111

Instrument: ACIS Obs ID: 5688 Source: AX J1426.9+2334 PI: Dr Kirpal Nandra Title: Bringing in the Last SHEEP

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-28T19:27:46 Date and time of file creation DATE-OBS 2005-04-10T18:52:56 Observation start date DATE-END 2005-04-10T20:37:57 Observation end date RA PNT 216.71899403611 Pointing RA DEC PNT 23.589874484529 Pointing Dec ROLL PNT 143.15952679384 Pointing Roll RA TARG 216.72625 Observer’s specified target RA DEC TARG 23.582778 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-28T19:42:21 Date and time of file creation DATE-OBS 2005-04-10T18:52:56 Observation start date DATE-END 2005-04-10T20:37:57 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-7 Detector GRATING NONE Grating OBJECT AX J1426.9+2334 Source name TITLE Bringing in the Last SHEEP Proposal title OBSERVER Dr Kirpal Nandra Principal investigator OBS ID 5688 Observation id SEQ NUM 701111 Sequence number RA NOM 216.71899403611 Nominal RA DEC NOM 23.589874484529 Nominal Dec ROLL NOM 143.15952679384 Nominal Roll

Summary Page Created:Tue February 28, 2006 14:43 EST page: 3 of 3

Chandra X-ray Center Seq Num: 701111

Instrument: ACIS Obs ID: 5688 Source: AX J1426.9+2334 PI: Dr Kirpal Nandra Title: Bringing in the Last SHEEP

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 216.746897 23.567807 64.000000 9.359462 6.838000 216.735907 23.614694 43.714287 8.318489 5.255075 216.729074 23.556243 33.428570 7.845758 4.260719 216.765179 23.624032 23.159090 6.548740 3.536419