Summary Page Created:Mon March 20, 2006 07:02 EST page: 1 of 3

Chandra X-ray Center Seq Num: 701067

Instrument: ACIS Obs ID: 6361 Source: CXO M82 J095550.2+694047 PI: Dr. Tod Strohmayer Title: Chandra and RXTE Observations of the Ultraluminous QPO Source in M82

acisf06361N002 full img2.fits acisf06361N002 cntr img2.fits

Summary Page Created:Mon March 20, 2006 07:02 EST page: 2 of 3

Chandra X-ray Center Seq Num: 701067

Instrument: ACIS Obs ID: 6361 Source: CXO M82 J095550.2+694047 PI: Dr. Tod Strohmayer Title: Chandra and RXTE Observations of the Ultraluminous QPO Source in M82

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-03-20T10:52:45 Date and time of file creation DATE-OBS 2005-08-18T15:55:56 Observation start date DATE-END 2005-08-18T21:48:16 Observation end date RA PNT 148.97050955963 Pointing RA DEC PNT 69.677863696041 Pointing Dec ROLL PNT 357.24599586091 Pointing Roll RA TARG 148.959167 Observer’s specified target RA DEC TARG 69.679722 Observer’s specified target Dec DATAMODE GRADED Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-03-20T12:00:55 Date and time of file creation DATE-OBS 2005-08-18T15:55:56 Observation start date DATE-END 2005-08-18T21:48:16 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-7 Detector GRATING NONE Grating OBJECT CXO M82 J095550.2+694047 Source name TITLE Chandra and RXTE Observations of the Ultraluminous QPO Source in M82 OBSERVER Dr. Tod Strohmayer Principal investigator OBS ID 6361 Observation id SEQ NUM 701067 Sequence number RA NOM 148.97050955963 Nominal RA DEC NOM 69.677863696041 Nominal Dec ROLL NOM 357.24599586091 Nominal Roll

Summary Page Created:Mon March 20, 2006 07:02 EST page: 3 of 3

Chandra X-ray Center Seq Num: 701067

Instrument: ACIS Obs ID: 6361 Source: CXO M82 J095550.2+694047 PI: Dr. Tod Strohmayer Title: Chandra and RXTE Observations of the Ultraluminous QPO Source in M82

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 148.958732 69.679578 15816.286133 131.736786 120.059753 148.962537 69.679117 2916.857178 68.817345 42.385494 148.943920 69.678017 912.000000 33.183773 27.483313 148.964312 69.676708 474.142853 34.123207 13.895026 148.977711 69.683608 146.857147 15.647625 9.385267 148.959564 69.672922 132.142853 17.860998 7.398403 148.944231 69.677130 111.571426 15.292719 7.295722 148.974135 69.680603 152.285721 20.997849 7.252444 148.908517 69.674828 78.571426 11.151512 7.045809 148.942245 69.674006 94.000000 15.649630 6.006532