Summary Page Created:Sun February 19, 2006 17:03 EST page: 1 of 3

Chandra X-ray Center Seq Num: 800501

Instrument: ACIS Obs ID: 5788 Source: HCG 40 PI: Prof Trevor Ponman Title: HI-Deficient Ultracompact Groups

acisf05788N002 full img2.fits acisf05788N002 cntr img2.fits

Summary Page Created:Sun February 19, 2006 17:03 EST page: 2 of 3

Chandra X-ray Center Seq Num: 800501

Instrument: ACIS Obs ID: 5788 Source: HCG 40 PI: Prof Trevor Ponman Title: HI-Deficient Ultracompact Groups

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-19T21:02:08 Date and time of file creation DATE-OBS 2005-01-29T14:01:01 Observation start date DATE-END 2005-01-29T23:45:32 Observation end date RA PNT 144.73628057839 Pointing RA DEC PNT -4.8488589266678 Pointing Dec ROLL PNT 28.657393451094 Pointing Roll RA TARG 144.727083 Observer’s specified target RA DEC TARG -4.851944 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.60722351 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-19T22:02:10 Date and time of file creation DATE-OBS 2005-01-29T14:01:01 Observation start date DATE-END 2005-01-29T23:45:32 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-35678 Detector GRATING NONE Grating OBJECT HCG 40 Source name TITLE HI-Deficient Ultracompact Groups Proposal title OBSERVER Prof Trevor Ponman Principal investigator OBS ID 5788 Observation id SEQ NUM 800501 Sequence number RA NOM 144.73628057839 Nominal RA DEC NOM -4.8488589266678 Nominal Dec ROLL NOM 28.657393451094 Nominal Roll

Summary Page Created:Sun February 19, 2006 17:03 EST page: 3 of 3

Chandra X-ray Center Seq Num: 800501

Instrument: ACIS Obs ID: 5788 Source: HCG 40 PI: Prof Trevor Ponman Title: HI-Deficient Ultracompact Groups

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 144.756124 -4.912893 323.714294 19.955935 16.221455 144.914101 -4.731186 737.421936 48.853439 15.094576 144.807063 -4.833728 262.000000 19.437592 13.479036 144.779063 -5.097749 385.358612 29.236025 13.180951 144.973460 -4.648266 665.591370 52.250500 12.738468 145.031598 -4.756815 736.548157 60.378174 12.198915 144.714754 -4.885133 138.714279 14.181730 9.781197 144.612502 -4.924736 177.568176 18.707026 9.492059 144.717886 -4.818548 114.142860 12.481939 9.144641 144.768695 -4.851686 108.428574 12.065403 8.986734