Summary Page Created:Mon February 27, 2006 06:06 EST page: 1 of 3

Chandra X-ray Center Seq Num: 800515

Instrument: ACIS Obs ID: 5802 Source: DLS J1356-1051 PI: Prof. John Hughes Title: Chandra Observations of the DLS Shear-Selected Cluster Survey

acisf05802N002 full img2.fits acisf05802N002 cntr img2.fits

Summary Page Created:Mon February 27, 2006 06:06 EST page: 2 of 3

Chandra X-ray Center Seq Num: 800515

Instrument: ACIS Obs ID: 5802 Source: DLS J1356-1051 PI: Prof. John Hughes Title: Chandra Observations of the DLS Shear-Selected Cluster Survey

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-27T10:33:54 Date and time of file creation DATE-OBS 2005-03-14T13:06:54 Observation start date DATE-END 2005-03-14T19:35:27 Observation end date RA PNT 209.03144792391 Pointing RA DEC PNT -10.851029065307 Pointing Dec ROLL PNT 71.046833086854 Pointing Roll RA TARG 209.028333 Observer’s specified target RA DEC TARG -10.854444 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.60722351 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-27T11:04:58 Date and time of file creation DATE-OBS 2005-03-14T13:06:54 Observation start date DATE-END 2005-03-14T19:35:27 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT DLS J1356-1051 Source name TITLE Chandra Observations of the DLS Shear-Selected Cluster Survey

Prop

OBSERVER Prof. John Hughes Principal investigator OBS ID 5802 Observation id SEQ NUM 800515 Sequence number RA NOM 209.03144792391 Nominal RA DEC NOM -10.851029065307 Nominal Dec ROLL NOM 71.046833086854 Nominal Roll

Summary Page Created:Mon February 27, 2006 06:06 EST page: 3 of 3

Chandra X-ray Center Seq Num: 800515

Instrument: ACIS Obs ID: 5802 Source: DLS J1356-1051 PI: Prof. John Hughes Title: Chandra Observations of the DLS Shear-Selected Cluster Survey

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 208.748038 -10.705807 1857.644531 52.916985 35.104881 208.747111 -10.704572 1332.771973 50.912460 26.177717 209.043089 -10.976808 96.113640 12.310729 7.807307 209.049753 -10.788777 51.238636 8.823511 5.807057 209.052907 -10.904420 47.000000 8.094467 5.806436 209.076378 -10.805642 49.397728 8.962740 5.511454 209.074886 -10.847178 41.000000 7.837658 5.231154 208.905790 -10.943692 53.872501 10.388500 5.185782 209.069761 -10.725491 38.750000 8.621208 4.494730 209.065112 -10.982846 38.666668 8.920149 4.334756