Summary Page Created:Sun February 19, 2006 15:18 EST page: 1 of 3

Chandra X-ray Center Seq Num: 800501

Instrument: ACIS Obs ID: 6203 Source: HCG 40 PI: Prof Trevor Ponman Title: HI-Deficient Ultracompact Groups

acisf06203N002 full img2.fits acisf06203N002 cntr img2.fits

Summary Page Created:Sun February 19, 2006 15:18 EST page: 2 of 3

Chandra X-ray Center Seq Num: 800501

Instrument: ACIS Obs ID: 6203 Source: HCG 40 PI: Prof Trevor Ponman Title: HI-Deficient Ultracompact Groups

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-19T19:49:09 Date and time of file creation DATE-OBS 2005-01-29T06:12:48 Observation start date DATE-END 2005-01-29T11:02:49 Observation end date RA PNT 144.73626026542 Pointing RA DEC PNT -4.8488622010334 Pointing Dec ROLL PNT 28.657403597947 Pointing Roll RA TARG 144.727083 Observer’s specified target RA DEC TARG -4.851944 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-19T20:17:44 Date and time of file creation DATE-OBS 2005-01-29T06:12:48 Observation start date DATE-END 2005-01-29T11:02:49 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-35678 Detector GRATING NONE Grating OBJECT HCG 40 Source name TITLE HI-Deficient Ultracompact Groups Proposal title OBSERVER Prof Trevor Ponman Principal investigator OBS ID 6203 Observation id SEQ NUM 800501 Sequence number RA NOM 144.73626026542 Nominal RA DEC NOM -4.8488622010334 Nominal Dec ROLL NOM 28.657403597947 Nominal Roll

Summary Page Created:Sun February 19, 2006 15:18 EST page: 3 of 3

Chandra X-ray Center Seq Num: 800501

Instrument: ACIS Obs ID: 6203 Source: HCG 40 PI: Prof Trevor Ponman Title: HI-Deficient Ultracompact Groups

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 144.913968 -4.731281 375.126251 31.907801 11.756568 144.756111 -4.912824 135.571426 13.664976 9.921088 144.779226 -5.097810 201.572418 20.521587 9.822457 145.031476 -4.757112 375.953491 40.437134 9.297234 144.807130 -4.833767 97.000000 12.332158 7.865614 144.973017 -4.652591 314.986725 41.509029 7.588390 144.612537 -4.925467 94.068184 13.184051 7.134998 144.593629 -4.968913 77.545456 12.953835 5.986293 144.714752 -4.885142 52.571430 9.761946 5.385343 144.995017 -4.686752 203.717850 38.317177 5.316620