Summary Page Created:Fri March 31, 2006 22:07 EST page: 1 of 3

Chandra X-ray Center Seq Num: 800500

Instrument: ACIS Obs ID: 7184 Source: XLSSJ022404.0-041328 PI: Dr Laurence Jones Title: A detailed study of a z>1 galaxy cluster

acisf07184N002 full img2.fits acisf07184N002 cntr img2.fits

Summary Page Created:Fri March 31, 2006 22:07 EST page: 2 of 3

Chandra X-ray Center Seq Num: 800500

Instrument: ACIS Obs ID: 7184 Source: XLSSJ022404.0-041328 PI: Dr Laurence Jones Title: A detailed study of a z>1 galaxy cluster

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-01T02:15:07 Date and time of file creation DATE-OBS 2005-10-14T19:17:58 Observation start date DATE-END 2005-10-15T02:22:54 Observation end date RA PNT 36.030611025914 Pointing RA DEC PNT -4.2089477711974 Pointing Dec ROLL PNT 54.157604233435 Pointing Roll RA TARG 36.017083 Observer’s specified target RA DEC TARG -4.224694 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 154.89736938 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-01T03:05:52 Date and time of file creation DATE-OBS 2005-10-14T19:17:58 Observation start date DATE-END 2005-10-15T02:22:54 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-23567 Detector GRATING NONE Grating OBJECT XLSSJ022404.0-041328 Source name TITLE A detailed study of a z>1 galaxy cluster

Proposal title

OBSERVER Dr Laurence Jones Principal investigator OBS ID 7184 Observation id SEQ NUM 800500 Sequence number RA NOM 36.030611025914 Nominal RA DEC NOM -4.2089477711974 Nominal Dec ROLL NOM 54.157604233435 Nominal Roll

Summary Page Created:Fri March 31, 2006 22:07 EST page: 3 of 3

Chandra X-ray Center Seq Num: 800500

Instrument: ACIS Obs ID: 7184 Source: XLSSJ022404.0-041328 PI: Dr Laurence Jones Title: A detailed study of a z>1 galaxy cluster

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 36.161897 -4.452890 299.875000 25.113070 11.940993 36.253801 -3.998828 555.043213 57.139591 9.713811 36.156829 -3.928564 419.435211 46.042770 9.109687 36.065713 -4.237964 113.285713 12.892590 8.786886 36.180671 -3.940986 309.916931 49.453144 6.266880 36.240730 -3.986729 340.458466 56.416782 6.034702 36.141383 -3.947640 241.500000 44.461662 5.431646 36.252632 -4.009198 260.228577 49.213749 5.287721 35.986259 -4.185046 45.397728 8.705163 5.215035 36.088805 -4.102751 57.137932 11.261502 5.073740