Summary Page Created:Wed March 15, 2006 17:35 EST page: 1 of 3

Chandra X-ray Center Seq Num: 900392

Instrument: ACIS Obs ID: 5892 Source: Sgr C PI: Dr. Hiroshi Murakami Title: Sgr C: A New X-Ray Reflection Nebula?

acisf05892N002 full img2.fits acisf05892N002 cntr img2.fits

Summary Page Created:Wed March 15, 2006 17:35 EST page: 2 of 3

Chandra X-ray Center Seq Num: 900392

Instrument: ACIS Obs ID: 5892 Source: Sgr C PI: Dr. Hiroshi Murakami Title: Sgr C: A New X-Ray Reflection Nebula?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-03-15T19:35:48 Date and time of file creation DATE-OBS 2005-07-22T01:58:12 Observation start date DATE-END 2005-07-23T05:59:47 Observation end date RA PNT 266.08819386195 Pointing RA DEC PNT -29.436646088624 Pointing Dec ROLL PNT 277.98784988886 Pointing Roll RA TARG 266.08957 Observer’s specified target RA DEC TARG -29.43218 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.60722351 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-03-15T22:33:26 Date and time of file creation DATE-OBS 2005-07-22T01:58:12 Observation start date DATE-END 2005-07-23T05:59:47 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012368 Detector GRATING NONE Grating OBJECT Sgr C Source name TITLE Sgr C: A New X-Ray Reflection Nebula?

Proposal title

OBSERVER Dr. Hiroshi Murakami Principal investigator OBS ID 5892 Observation id SEQ NUM 900392 Sequence number RA NOM 266.08819386195 Nominal RA DEC NOM -29.436646088624 Nominal Dec ROLL NOM 277.98784988886 Nominal Roll

Summary Page Created:Wed March 15, 2006 17:35 EST page: 3 of 3

Chandra X-ray Center Seq Num: 900392

Instrument: ACIS Obs ID: 5892 Source: Sgr C PI: Dr. Hiroshi Murakami Title: Sgr C: A New X-Ray Reflection Nebula?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 266.214970 -29.345012 91626.828125 333.858795 274.447845 266.261718 -29.168893 726.607971 56.685757 12.818175 266.121298 -29.329492 259.977509 20.738037 12.536264 266.456166 -29.514406 851.247314 69.145027 12.311043 266.413319 -29.270495 740.763306 60.440559 12.256063 266.147913 -29.501283 198.208328 18.408855 10.767010 266.442038 -29.431944 548.382080 52.024933 10.540755 266.261084 -29.178067 624.331238 59.276634 10.532501 266.136208 -29.465529 153.113632 14.609178 10.480647 266.077059 -29.358765 182.571426 17.611551 10.366573